)c (GeV/ Tp 0 5 10 15 20 25 30

))c b/(GeV/ μ) ( yd_Tp/(d σ^2d

5-10

4-10

3-10

2-10

1-10 1 10 3.4%± ^{-1} = 3.2 pb_{int}

ALICE, L 3.9%

± ^{-1}

= 3.1 pb int LHCb, L Systematic uncertainty BR uncert.: 0.6%

<4 y , 2.5< ψ = 13 TeV, inclusive J/ s pp